/*
 * Author: 	Zhang,Heyang
 * Created Date: 06/06/2023
 * Purpose: When copying QIS, check whether the current record status allows replication
 * Test Class: LexQISCloneButtonControllerTest
 *
 * */
public with sharing class LexQISCloneButtonController {
    public LexQISCloneButtonController() {

    }
    @AuraEnabled
    public static Boolean checkStatus(String recordId){
        QIS_Report__c qis = [SELECT Id,QIS_Status__c FROM QIS_Report__c WHERE id =: recordId LIMIT 1];
        return qis.QIS_Status__c == '取消'? true : false;
    }
}