/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否覆盖率目标（分母）
@Version 1.0
*****************************************************************************************************/
global class EquipmentCoverageTargetBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date start_dateH1 ;
    public Date end_dateH1 ;
    public List<Id> hospIds = new List<Id>();
    public Date toDayTime = Date.today();
    public String OCSM_Period_half;
    public String OCSM_Period;
    private BatchIF_Log__c iflog;
    public List < String > accountIdList;
    public Date egdTime;
    global EquipmentCoverageTargetBatch() {
        this.query = query;
        OCSM_Period = 'FY'+toDayTime.year();
    }

    global EquipmentCoverageTargetBatch(List < String > accountIdList) {
        this.query = query;
        this.accountIdList = accountIdList;
    }

    global Database.QueryLocator start(Database.BatchableContext bc) {
        
        system.debug('执行start');
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRealCoverageBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
        }else{
            OCSM_Period_half = '2H';
        }
        // 5条以上软性镜医院&&医院有效
        egdTime = Date.newInstance(toDayTime.year()+1,3,1);
        List<AggregateResult> results = new List<AggregateResult>();
        
        String groupQuery = 'SELECT count(Id),Hospital__c' 
                            + ' FROM Asset' 
                            + ' WHERE Product2.ServiceCategory__c =\'软性镜\' AND Is_Active__c =\'有効\' AND RecordType.DeveloperName  =\'HP\' ';
        if (accountIdList != null && accountIdList.size() > 0) {
            groupQuery += ' AND Hospital__c IN :accountIdList';
        }
        groupQuery += ' Group by Hospital__c having count(Id)>=5';

        System.debug(LoggingLevel.INFO, '*** groupQuery: ' + groupQuery);
        results = Database.query(groupQuery);
        if(results!=null && results.size() > 0){
           for (AggregateResult a1 : results) {
               hospIds.add(String.valueOf(a1.get('Hospital__c')));
           }
        }
        return Database.getQueryLocator([SELECT Id,IF_Coverage_Target_HP__c,
                                            (SELECT Id,Hospital__c,Hospital__r.IF_Coverage_Target_HP__c,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,
                                            CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,
                                            Product2.ServiceCategory__c,Product2.Category3__c 
                                            FROM Asset_Hospital__r 
                                            WHERE Product2.ServiceCategory__c != null 
                                            AND Product2.Maintenance_Price_Year__c != 0
                                            AND Status != '廃棄'
                                            AND Status != '待报废'
                                            AND IF_StopParts_production__c != '1'
                                            AND ((SerMarGuranteeType__c = null AND Extend_Gurantee_DateTo__c = null) 
                                            OR (SerMarGuranteeType__c!=null AND Extend_Gurantee_DateTo__c < :egdTime) 
                                            OR CurrentContract__c = null) ) ,
                                            (SELECT Id ,Target_Rigid_Mirror_2__c,Target_Soft_Mirror_2__c,Target_Correlation_Lightsource__c,Account_HP__c,OCSM_Period_half__c 
                                                FROM Account_Servicetarget__r 
                                                WHERE OCSM_Period_half__c = :OCSM_Period_half 
                                                AND OCSM_Period__c = :OCSM_Period)
                                        FROM Account WHERE Id IN:hospIds]);
    }

    global void execute(Database.BatchableContext BC, list<Account> accList) {
        system.debug('执行execute');

        List<Asset> assetList = new List<Asset>();
        List<Account_Service_Of_Target__c> targetObjs = new List<Account_Service_Of_Target__c>(); 
        for(Account acc:accList){
            acc.IF_Coverage_Target_HP__c = '1';
            // 覆盖目标（硬）
            Integer mirror_1 = 0;
            // 覆盖目标（软）
            Integer mirror_2 = 0;
            //覆盖目标（周边）
            Integer mirror_3 = 0;
            for(Asset ass: acc.Asset_Hospital__r){
                ass.IF_Coverage_Target_Asset__c = '1';
                assetList.add(ass);
                if (ass.Product2.ServiceCategory__c == '硬性镜') {
                    mirror_1++;
                }
                if(ass.Product2.ServiceCategory__c =='软性镜'){
                    mirror_2++;
                }
                if (ass.Product2.ServiceCategory__c == '周边') {
                    mirror_3++;
                }   
            }
            System.debug(LoggingLevel.INFO, '*** mirror_1: ' + mirror_1);
            System.debug(LoggingLevel.INFO, '*** mirror_2: ' + mirror_2);
            System.debug(LoggingLevel.INFO, '*** mirror_3: ' + mirror_3);
            if(acc.Account_Servicetarget__r.size() > 0){

                for(Account_Service_Of_Target__c asotOne: acc.Account_Servicetarget__r){
                    asotOne.Coverage_Target_Account__c = true;
                    asotOne.Target_Rigid_Mirror_2__c += mirror_1;
                    asotOne.Target_Soft_Mirror_2__c += mirror_2;
                    asotOne.Target_Correlation_Lightsource__c += mirror_3;
                    targetObjs.add(asotOne);
                }
            }else{
                Account_Service_Of_Target__c asot1 = new Account_Service_Of_Target__c();
                asot1.Account_HP__c = acc.Id;
                asot1.Coverage_Target_Account__c = true;
                asot1.Target_Rigid_Mirror_2__c = mirror_1;
                asot1.Target_Soft_Mirror_2__c = mirror_2;
                asot1.Target_Correlation_Lightsource__c = mirror_3;
                asot1.OCSM_Period__c = OCSM_Period; 
                asot1.OCSM_Period_half__c = OCSM_Period_half;
                targetObjs.add(asot1);
            }

        }

        Oly_TriggerHandler.bypass('AssetTrigger');
        system.debug('执行update AssetsTarget前');
        update assetList;  
        system.debug('执行update accList前'); 
        Oly_TriggerHandler.bypass('AccountTrigger');
        update accList;  
        UpSert targetObjs;
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRealCoverageBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}