/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否覆盖率实际（分子）
@Version 1.0
*****************************************************************************************************/
global class EquipmentRealCoverageRealBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date start_dateH1 ;
    public Date end_dateH1 ;
    public Date toDayTime = Date.today();
    private BatchIF_Log__c iflog;
    public String OCSM_Period_half;
    public String OCSM_Period = 'FY'+toDayTime.year();
    public List < String > accountIdList;
    global EquipmentRealCoverageRealBatch() {
        this.query = query;
    }
    global EquipmentRealCoverageRealBatch(List < String > accountIdList) {
        this.query = query;
        this.accountIdList = accountIdList;
    }
    global Database.QueryLocator start(Database.BatchableContext bc) {
         system.debug('执行start');
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRealCoverageBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
        }else{
            OCSM_Period_half = '2H';
        }
        if (accountIdList != null && accountIdList.size() > 0) {
            query = 'select id,Hospital__c,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset where '
                     +' IF_StopParts_production__c != \'1\' and CurrentContract__c != null and Hospital__c in :accountIdList'
                     +' and (CurrentContract__r.Contract_End_Date__c >= :start_dateH1 and CurrentContract__r.Contract_Conclusion_Date__c <= :end_dateH1) order by hospital__c';
        }else{
            query = 'select id,Hospital__c,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset where '
                     +' IF_StopParts_production__c != \'1\' and CurrentContract__c != null'
                     +' and (CurrentContract__r.Contract_End_Date__c >= :start_dateH1 and CurrentContract__r.Contract_Conclusion_Date__c <= :end_dateH1) order by hospital__c';
        }
        
            // 实际设备合同时间区间1H(4,9);2H(10,3)
            if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
                start_dateH1 = Date.newInstance(toDayTime.year(),9,1);
                end_dateH1 = Date.newInstance(toDayTime.year(),9,30);
            }else{
                start_dateH1 = Date.newInstance(toDayTime.year(),3,1);
                end_dateH1 = Date.newInstance(toDayTime.year(),3,31);
            }
        return Database.getQueryLocator(query);
    }

    global void execute(Database.BatchableContext BC, list<Asset> Assets) {
       
        List<Account_Service_Of_Target__c> asots = new List<Account_Service_Of_Target__c>();
        // List<Account_Service_Of_Target__c> asotsIN = new List<Account_Service_Of_Target__c>();
        List<Id> accIds = new List<Id>();
        Map<String,Account_Service_Of_Target__c> asotMap = new Map<String,Account_Service_Of_Target__c>();
        for (Asset ass : Assets) {
            accIds.add(ass.Hospital__c);
        }
        List<Account_Service_Of_Target__c> asotList = [select Id,Finish_Rigid_Mirror_2__c,Finish_Correlation_Lightsource__c,Finish_Rigid_Mirror_1__c,Account_HP__c,OCSM_Period_half__c 
                                                    from Account_Service_Of_Target__c 
                                                    where Account_HP__c in :accIds and OCSM_Period_half__c = :OCSM_Period_half 
                                                    and OCSM_Period__c = :OCSM_Period];
        if (asotList != null) {
            for (Account_Service_Of_Target__c asot : asotList) {
                for (Id accid : accIds) {
                    if (asot.Account_HP__c == accid) {
                        asotMap.put(accid,asot);
                    }
                }
            }
        }   
            
            
            List<Asset> AssetsReal = new List<Asset>();
            for (Asset ass1 : Assets) {
                // 实际覆盖数（硬）
                Integer mirror_4 = 0;
                
                // 实际覆盖数（周边）
                Integer mirror_6 = 0;
                // 实际覆盖数（软）
                Integer mirror_7 = 0;
                // 标记是否覆盖率实际设备
                ass1.IF_Coverage_Real_Asset__c = '1';
                AssetsReal.add(ass1);
                if (ass1.Product2.ServiceCategory__c == '硬性镜') {
                    mirror_4++;
                }
                if (ass1.Product2.ServiceCategory__c == '周边') {
                    mirror_6++;
                }
                if (ass1.Product2.ServiceCategory__c =='软性镜') {
                    mirror_7++;
                }
                if (asotMap.containsKey(ass1.hospital__c)) {
                    Account_Service_Of_Target__c asotOne = new Account_Service_Of_Target__c();
                    asotOne = asotMap.get(ass1.hospital__c);
                    asotOne.Finish_Rigid_Mirror_2__c += mirror_4;
                    asotOne.Finish_Correlation_Lightsource__c += mirror_6;
                    asotOne.Finish_Rigid_Mirror_1__c += mirror_7;
                    if (!asots.contains(asotOne)) {
                        asots.add(asotOne);
                    }
                }else{
                    Account_Service_Of_Target__c asot1 = new Account_Service_Of_Target__c();
                    asot1.Account_HP__c = ass1.hospital__c;
                    asot1.Finish_Rigid_Mirror_2__c = mirror_4;
                    asot1.Finish_Correlation_Lightsource__c = mirror_6;
                    asot1.Finish_Rigid_Mirror_1__c = mirror_7;
                    asot1.OCSM_Period__c =  OCSM_Period;
                    asot1.OCSM_Period_half__c = OCSM_Period_half; 
                    asotMap.put(ass1.hospital__c,asot1);
                    if (!asots.contains(asot1)) {
                        asots.add(asot1);
                    }  
                }
            }
            upsert asots;
        system.debug('这个集合：AssetsReal ==='+AssetsReal);
        if (AssetsReal!=null) {
            try {
                Oly_TriggerHandler.bypass('AssetTrigger');
                update AssetsReal;
            }
            catch (Exception e) {
                iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsReal:'+']'+e.getMessage()+'\n';
             }
        }  
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRealCoverageBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}