/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否续签率实际（分子）
@Version 1.0
*****************************************************************************************************/
global class EquipmentRenewMoleculeBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date toDayTime = Date.today();
    private BatchIF_Log__c iflog;
    public String OCSM_Period_half;
    public String OCSM_Period = 'FY'+toDayTime.year();
    public Date effectiveTime;
    public List < String > accountIdList;
    global EquipmentRenewMoleculeBatch() {
        this.query = query;
    }
    global EquipmentRenewMoleculeBatch(List < String > accountIdList) {
        this.query = query;
        this.accountIdList = accountIdList;
    }
    global Database.QueryLocator start(Database.BatchableContext bc) {
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRenewMoleculeBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
            effectiveTime = Date.newInstance(toDayTime.year(),9,30);
        }else{
            OCSM_Period_half = '2H';
            effectiveTime = Date.newInstance(toDayTime.year()+1,3,31);
        }
        if (accountIdList != null && accountIdList.size() > 0) {
            // 保有设备不为零件停产
        query = 'select Id,Hospital__c,CurrentContract__c,CurrentContract__r.Contract_Conclusion_Date__c,CurrentContract__r.New_Contract_TypeF_Text__c,Product2.ServiceCategory__c,Product2.Category3__c,Product2.Category4__c'
                +' from Asset where Hospital__c in :accountIdList and IF_Parts_production__c != \'1\' and CurrentContract__r.New_Contract_TypeF_Text__c =\'续签合同\''
                +' and CurrentContract__r.Contract_Conclusion_Date__c <= :effectiveTime order by hospital__c';
        }else{
            // 保有设备不为零件停产
        query = 'select Id,Hospital__c,CurrentContract__c,CurrentContract__r.Contract_Conclusion_Date__c,CurrentContract__r.New_Contract_TypeF_Text__c,Product2.ServiceCategory__c,Product2.Category3__c,Product2.Category4__c'
                +' from Asset where IF_Parts_production__c != \'1\' and CurrentContract__r.New_Contract_TypeF_Text__c =\'续签合同\''
                +' and CurrentContract__r.Contract_Conclusion_Date__c <= :effectiveTime order by hospital__c';
        }
        return Database.getQueryLocator(query);
    }   

    global void execute(Database.BatchableContext BC, list<Asset> Assets) {

        List<Account_Service_Of_Target__c> asots = new List<Account_Service_Of_Target__c>();
        List<Id> accIds = new List<Id>();
        Map<String,Account_Service_Of_Target__c> asotMap = new Map<String,Account_Service_Of_Target__c>();
        for (Asset ass1 : Assets) {
            accIds.add(ass1.Hospital__c);
        }
        List<Account_Service_Of_Target__c> asotList = [select Id,Renew_Finish_Rigid_Mirror_1__c,Renew_Finish_Rigid_Mirror_2__c,Renew_Finish_Rigid_Mirror_3__c,Renew_Finish_Correlation_Lightsource__c,Renew_Finish_Else__c,Account_HP__c,OCSM_Period_half__c 
                                                    from Account_Service_Of_Target__c 
                                                    where Account_HP__c in :accIds and OCSM_Period_half__c = :OCSM_Period_half 
                                                    and OCSM_Period__c = :OCSM_Period];

        if (asotList != null) {
            for (Account_Service_Of_Target__c asot : asotList) {
                for (Id accid : accIds) {
                    if (asot.Account_HP__c == accid) {
                        asotMap.put(accid,asot);
                    }
                }
            }
        }
            List<Asset> AssetsReal = new List<Asset>();
            
            for ( Asset ass :  Assets) {
                
                // 实际续签数（硬）
                Integer mirror_5 = 0;
                // 实际续签数（周边）
                Integer mirror_6 = 0;
                // 实际续签数（软）
                Integer mirror_7 = 0;
                // 实际续签数(其他)
                Integer mirror_8 = 0;
                // 分子
                // 1. 设备关联的合同类型是“续签合同”，
                    // 2. 在2023年3月31日前系统生效完毕：2023年3月31日是2H，1H是指2022年9月30日，
                    // 标记为是否续签实际设备
                    ass.IF_Renewalrate_Real_Asset__c = '1';
                    AssetsReal.add(ass); 

                    
                    if (ass.Product2.ServiceCategory__c == '硬性镜') {
                        mirror_5++;
                    }
                    if (ass.Product2.ServiceCategory__c == '周边') {
                        mirror_6++;
                    }
                    if (ass.Product2.ServiceCategory__c =='软性镜') {
                        mirror_7++;
                    }
                    if (ass.Product2.ServiceCategory__c == null) {
                        mirror_8++;
                    }
            
                if (asotMap.containsKey(ass.Hospital__c)) {
                    Account_Service_Of_Target__c asotOne = new Account_Service_Of_Target__c();
                        asotOne = asotMap.get(ass.Hospital__c);
                        asotOne.Renew_Finish_Rigid_Mirror_3__c += mirror_5;
                        asotOne.Renew_Finish_Correlation_Lightsource__c += mirror_6;
                        asotOne.Renew_Finish_Rigid_Mirror_1__c += mirror_7;
                        asotOne.Renew_Finish_Else__c += mirror_8;
                        if (!asots.contains(asotOne)) {
                            asots.add(asotOne);
                        } 
                }else{
                    Account_Service_Of_Target__c asot1 = new Account_Service_Of_Target__c();
                    asot1.Account_HP__c = ass.Hospital__c;
                    asot1.Renew_Finish_Rigid_Mirror_3__c = mirror_5;
                    asot1.Renew_Finish_Correlation_Lightsource__c = mirror_6;
                    asot1.Renew_Finish_Rigid_Mirror_1__c = mirror_7;
                    asot1.Renew_Finish_Else__c = mirror_8;
                    asot1.OCSM_Period__c = OCSM_Period; 
                    asot1.OCSM_Period_half__c = OCSM_Period_half;
                    asotMap.put(ass.hospital__c,asot1);
                    if (!asots.contains(asot1)) {
                            asots.add(asot1);
                        }
                }
            }   
        if (AssetsReal!=null) {
                    try {
                        update AssetsReal;
                    }
                    catch (Exception e) {
                        iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsReal:'+']'+e.getMessage()+'\n';
                     }
            }
        if (asots!=null) {
                try {
                    UpSert asots;
                }
                catch (Exception e) {
                    iflog.ErrorLog__c += 'ERROR'+'['+'UpSert asots:'+']'+e.getMessage()+'\n';
                }  
        } 
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRenewMoleculeBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}