/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否续签率目标（分母）
@Version 1.0
*****************************************************************************************************/
global class EquipmentRenewTargetBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date toDayTime = Date.today();
    public Date start_date1 ;
    public Date end_date1 ;
    public Date start_date2 ;
    public Date end_date2 ;
    public Date deadlineTime;
    public String OCSM_Period_half;
    public String OCSM_Period = 'FY'+toDayTime.year();
    private BatchIF_Log__c iflog;
    public List < String > accountIdList;
    global EquipmentRenewTargetBatch() {
        this.query = query;
        
    }
    global EquipmentRenewTargetBatch(List < String > accountIdList) {
        this.query = query;
        this.accountIdList = accountIdList;
    }
    global Database.QueryLocator start(Database.BatchableContext bc) {
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRenewTargetBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
        }else{
            OCSM_Period_half = '2H';
        }
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            start_date1 = Date.newInstance(toDayTime.year()-1,4,1);
            end_date1 = Date.newInstance(toDayTime.year()-1,12,31);
            start_date2 = Date.newInstance(toDayTime.year(),1,1);
            end_date2 = Date.newInstance(toDayTime.year(),6,30);
            deadlineTime = Date.newInstance(toDayTime.year(),3,31);
        }else{
            start_date1 = Date.newInstance(toDayTime.year()-1,10,1);
            end_date1 = Date.newInstance(toDayTime.year(),6,30);
            start_date2 = Date.newInstance(toDayTime.year(),7,1);
            end_date2 = Date.newInstance(toDayTime.year(),12,31);
            deadlineTime = Date.newInstance(toDayTime.year(),9,30);
        }
        if (accountIdList != null && accountIdList.size() > 0) {
            // 保有设备不为零件停产
            query ='select Id,Hospital__c,CurrentContract_F__r.IF_Target_Renew__c,CurrentContract__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Start_Date__c,Product2.ServiceCategory__c,CurrentContract__r.Status__c,Product2.Category3__c,Product2.Category4__c' 
                    + ' from Asset where IF_Parts_production__c != \'1\' and Hospital__c in :accountIdList  and Product2.ServiceCategory__c != null'
                    // 测试不开启
                    +' and CurrentContract_F__r.IF_Target_Renew__c = \'1\''
                    + ' and ((CurrentContract__r.Contract_End_Date__c>= :start_date1 and CurrentContract__r.Contract_End_Date__c<= :end_date1) '
                    +' or (CurrentContract__r.Contract_End_Date__c>= :start_date2 and CurrentContract__r.Contract_End_Date__c<= :end_date2)) order by hospital__c';
        }else{
            // 保有设备不为零件停产
        query ='select Id,Hospital__c,CurrentContract_F__r.IF_Target_Renew__c,CurrentContract__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Start_Date__c,Product2.ServiceCategory__c,CurrentContract__r.Status__c,Product2.Category3__c,Product2.Category4__c' 
                + ' from Asset where IF_Parts_production__c != \'1\' and Product2.ServiceCategory__c != null '
                // 测试不开启
                +' and CurrentContract_F__r.IF_Target_Renew__c = \'1\''
                + ' and ((CurrentContract__r.Contract_End_Date__c>= :start_date1 and CurrentContract__r.Contract_End_Date__c<= :end_date1) '
                +' or (CurrentContract__r.Contract_End_Date__c>= :start_date2 and CurrentContract__r.Contract_End_Date__c<= :end_date2)) order by hospital__c';
        }  
        return Database.getQueryLocator(query);
    }

    global void execute(Database.BatchableContext BC, list<Asset> Assets) {
        List<Account_Service_Of_Target__c> asots = new List<Account_Service_Of_Target__c>();
        List<Id> accIds = new List<Id>();
        Map<String,Account_Service_Of_Target__c> asotMap = new Map<String,Account_Service_Of_Target__c>();
        for (Asset ass : Assets) {
            accIds.add(ass.Hospital__c);
        }
        List<Account_Service_Of_Target__c> asotList = [select Id,Renew_Target_Rigid_Mirror_2__c,Renew_Target_Soft_Mirror_2__c,Renew_Target_Correlation_Lightsource__c,Account_HP__c,OCSM_Period_half__c 
                                                    from Account_Service_Of_Target__c 
                                                    where Account_HP__c in :accIds and OCSM_Period_half__c = :OCSM_Period_half 
                                                    and OCSM_Period__c = :OCSM_Period];
        if (asotList != null) {
            for (Account_Service_Of_Target__c asot : asotList) {
                for (Id accid : accIds) {
                    if (asot.Account_HP__c == accid) {
                        asotMap.put(accid,asot);
                    }
                }
            }
        }
            List<Asset> AssetsTarget = new List<Asset>();
                

            for (Asset ass : Assets) {
                    // 分母
                    /*1H考核对象： 1）、2021.4.1-2021.12.31合同结束且截止2022.3.31未续签的设备；
                    2）、2022.1.1-2022.6.30合同结束，不论该设备是否续签
                    2H考核对象： 1）、2021.10.1-2022.6.30合同结束且截止2022.9.30未续签的设备；
                    2）、2022.7.1-2022.12.31 合同结束，不论该设备是否续签
                    */
                // 续签目标（硬）
                Integer mirror_1 = 0;
                // 续签目标（软）
                Integer mirror_2 = 0;
                //续签目标（周边）
                Integer mirror_3 = 0;
                        Boolean result = true;
                        if (ass.Product2.ServiceCategory__c != null) {
                            if ( ass.CurrentContract__r.Contract_End_Date__c != null && ass.CurrentContract__r.Contract_End_Date__c>=start_date1&&ass.CurrentContract__r.Contract_End_Date__c<=end_date1){
                                if (ass.CurrentContract__c == null || ass.CurrentContract__r.Status__c == '合同结束') {
                                    ass.IF_Renewalrate_Target_Asset__c = '1';
                                    AssetsTarget.add(ass);
                                    result = false;
                                }
                                if (result) {
                                    if (ass.CurrentContract__r.Contract_Start_Date__c != null && ass.CurrentContract__r.Contract_Start_Date__c <= deadlineTime) {
                                    ass.IF_Renewalrate_Target_Asset__c = '1';
                                    AssetsTarget.add(ass);
                                    }
                                } 
                            }
                            if (ass.CurrentContract__r.Contract_End_Date__c != null && ass.CurrentContract__r.Contract_End_Date__c>=start_date2&&ass.CurrentContract__r.Contract_End_Date__c<=end_date2) {
                                ass.IF_Renewalrate_Target_Asset__c = '1';
                                AssetsTarget.add(ass);
                            }
                        }   
                        if (ass.Product2.ServiceCategory__c == '硬性镜') {
                            mirror_1++;
                        }
                        if(ass.Product2.ServiceCategory__c =='软性镜'){
                            mirror_2++;
                        }
                        if (ass.Product2.ServiceCategory__c == '周边') {
                            mirror_3++;
                        } 
                if (asotMap.containsKey(ass.Hospital__c)) {
                    Account_Service_Of_Target__c asotOne = new Account_Service_Of_Target__c();
                        asotOne = asotMap.get(ass.Hospital__c);
                        asotOne.Renewalrate_Target_Account__c = true;
                        asotOne.Renew_Target_Rigid_Mirror_2__c += mirror_1;
                        asotOne.Renew_Target_Soft_Mirror_2__c += mirror_2;
                        asotOne.Renew_Target_Correlation_Lightsource__c += mirror_3;
                        if (!asots.contains(asotOne)) {
                            asots.add(asotOne);
                        }  
                }else{
                    Account_Service_Of_Target__c asot1 = new Account_Service_Of_Target__c();
                    asot1.Account_HP__c = ass.Hospital__c;
                    asot1.Renewalrate_Target_Account__c = true;
                    asot1.Renew_Target_Rigid_Mirror_2__c = mirror_1;
                    asot1.Renew_Target_Soft_Mirror_2__c = mirror_2;
                    asot1.Renew_Target_Correlation_Lightsource__c = mirror_3;
                    asot1.OCSM_Period__c = OCSM_Period; 
                    asot1.OCSM_Period_half__c = OCSM_Period_half;
                    asotMap.put(ass.hospital__c,asot1);
                    if (!asots.contains(asot1)) {
                        asots.add(asot1);
                    } 
                }
            }
        if (AssetsTarget!=null) {
            try {
                update AssetsTarget;
            }
            catch (Exception e) {
                iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsTarget:'+']'+e.getMessage()+'\n';
             }
        }
        if (asots!=null) {
            try {
                UpSert asots;
            }
            catch (Exception e) {
                iflog.ErrorLog__c += 'ERROR'+'['+'UpSert asots:'+']'+e.getMessage()+'\n';
            }  
        }
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRenewTargetBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}