/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否覆盖率目标（分母）
@Version 1.0
*****************************************************************************************************/
global class EquipmentCoverageTargetBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date start_dateH1 ;
    public Date end_dateH1 ;
    public List<Id> hospIds = new List<Id>();
    public Date toDayTime = Date.today();
    public String OCSM_Period_half;
    public String OCSM_Period = 'FY'+toDayTime.year();
    private BatchIF_Log__c iflog;
    global EquipmentCoverageTargetBatch() {
        this.query = query;
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRealCoverageBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
        }else{
            OCSM_Period_half = '2H';
        }
      

    }

    global Database.QueryLocator start(Database.BatchableContext bc) {
        // query = 'select Id,(select id,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset_Hospital__r where Status != \'廃棄\' and Status != \'待报废\''
        //              +' and IF_Parts_production__c != \'1\''
        //              +' and ((SerMarGuranteeType__c != \'服务多年保修\' and SerMarGuranteeType__c != \'市场多年保修\') or Extend_Gurantee_DateTo__c >= :egdTime)'
        //              +' and Product2.ServiceCategory__c != null) from Account where id in :hospIds';
        system.debug('执行start');
        query = 'select Id,Hospital__c,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset'
                +' where Hospital__c in :hospIds and Product2.ServiceCategory__c != null and Status != \'廃棄\' and Status != \'待报废\' and CurrentContract__c != null'
                +' and IF_Parts_production__c != \'1\' and SerMarGuranteeType__c = null and (Extend_Gurantee_DateTo__c = null or Extend_Gurantee_DateTo__c < :egdTime) order by hospital__c';

        // 5条以上软性镜医院&&医院有效
        Date egdTime = Date.newInstance(toDayTime.year()+1,3,1);
        List<AggregateResult> Asset1 = [select count(Id),Hospital__c from asset where Product2.ServiceCategory__c ='软性镜'  Group by Hospital__c having count(Id)>=5];
        if(Asset1!=null){
           for (AggregateResult a1 : Asset1) {
               hospIds.add(String.valueOf(a1.get('Hospital__c')));
           }
        }
        
        return Database.getQueryLocator(query);
    }

    global void execute(Database.BatchableContext BC, list<Asset> Assets) {
        List<Account_Service_Of_Target__c> asots = new List<Account_Service_Of_Target__c>();
        // List<Account_Service_Of_Target__c> asotsIN = new List<Account_Service_Of_Target__c>();
        List<Id> accIds = new List<Id>();
        Map<String,Account_Service_Of_Target__c> asotMap = new Map<String,Account_Service_Of_Target__c>();

        for (Asset ass1 : Assets) {
            accIds.add(ass1.Hospital__c);
        }
        List<Account_Service_Of_Target__c> asotList = [select Id,Target_Rigid_Mirror_2__c,Target_Soft_Mirror_2__c,Target_Correlation_Lightsource__c,Account_HP__c,OCSM_Period_half__c 
                                                    from Account_Service_Of_Target__c 
                                                    where Account_HP__c in :accIds and OCSM_Period_half__c = :OCSM_Period_half 
                                                    and OCSM_Period__c = :OCSM_Period];
        if (asotList != null) {
            for (Account_Service_Of_Target__c asot : asotList) {
                for (Id accid : accIds) {
                    if (asot.Account_HP__c == accid) {
                        asotMap.put(accid,asot);
                    }
                }
            }
        }
            List<Asset> AssetsTarget = new List<Asset>();
            for (Asset ass1 : Assets) {
                // 覆盖目标（硬）：泌尿科用硬性镜
                Integer mirror_1 = 0;
                // 覆盖目标（软）：鼻咽喉镜
                Integer mirror_2 = 0;
                //覆盖目标（周边）：光源
                Integer mirror_3 = 0;
                // 标记是否覆盖率目标设备
                ass1.IF_Coverage_Target_Asset__c = '1';
                 AssetsTarget.add(ass1);
               
                if (ass1.Product2.Category4__c == '泌尿科用硬性镜') {
                    mirror_1++;
                }
                if(ass1.Product2.ServiceCategory__c =='软性镜'){
                    mirror_2++;
                }
                if (ass1.Product2.Category3__c == '光源') {
                    mirror_3++;
                }   
                if (asotMap.containsKey(ass1.Hospital__c)) {
                    Account_Service_Of_Target__c asotOne = asotMap.get(ass1.Hospital__c);
                    system.debug('asotOne=='+ asotOne);
                    asotOne.Coverage_Target_Account__c = true;
                    asotOne.Target_Rigid_Mirror_2__c += mirror_1;
                    asotOne.Target_Soft_Mirror_2__c += mirror_2;
                    asotOne.Target_Correlation_Lightsource__c += mirror_3;
                    if (!asots.contains(asotOne)) {
                        asots.add(asotOne);
                    }
                }else{
                    Account_Service_Of_Target__c asot1 = new Account_Service_Of_Target__c();
                    asot1.Account_HP__c = ass1.Hospital__c;
                    asot1.Coverage_Target_Account__c = true;
                    asot1.Target_Rigid_Mirror_2__c = mirror_1;
                    asot1.Target_Soft_Mirror_2__c = mirror_2;
                    asot1.Target_Correlation_Lightsource__c = mirror_3;
                    asot1.OCSM_Period__c = OCSM_Period; 
                    asot1.OCSM_Period_half__c = OCSM_Period_half;
                    asotMap.put(ass1.hospital__c,asot1);
                    if (!asots.contains(asot1)) {
                        asots.add(asot1);
                    } 
                }
            }
            UpSert asots;
        if (AssetsTarget!=null) {
                    try {
                        system.debug('执行update');
                        Oly_TriggerHandler.bypass('AssetTrigger');
                        update AssetsTarget;
                    }
                    catch (Exception e) {
                        iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsTarget:'+']'+e.getMessage()+'\n';
                     }
        }
                
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRealCoverageBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}