global class EquipmentRealCoverageBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date start_dateH1 ;
    public Date end_dateH1 ;
    public List<Id> conIds = new List<Id>();
    public List<Id> hospIds = new List<Id>();
    public Date toDayTime = Date.today();

    // public String type ;
    private BatchIF_Log__c iflog;
    global EquipmentRealCoverageBatch() {
        // if (i == 1) {
        //     this.query = 'select Id,(select Id,IF_Coverage_Real_Asset__c from Asset_Hospital__r where CurrentContract__c In :conIds) from Account';
        //     type = '分子';
        // }
        // if (i == 2) {
        this.query = 'select Id,(select id,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset_Hospital__r where Status != \'廃棄\' and Status != \'待报废\''
                     +' and IF_Parts_production__c != \'1\' AND IF_Coverage_Target_Asset__c =\'1\''
                     +' and ((SerMarGuranteeType__c != \'服务多年保修\' and SerMarGuranteeType__c != \'市场多年保修\') or Extend_Gurantee_DateTo__c >= :egdTime)'
                     +' and Product2.ServiceCategory__c != null) from Account where id in :hospIds';
            // type = '分母';
        // }
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRealCoverageBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
    }

    global Database.QueryLocator start(Database.BatchableContext bc) {
        // if (type == '分子') {
        //      List<Maintenance_Contract__c> conList = new List<Maintenance_Contract__c>();
        //      // 判断为1H还是为2H
        //     if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
        //         start_dateH1 = Date.newInstance(toDayTime.year(),4,1);
        //         end_dateH1 = Date.newInstance(toDayTime.year(),9,30);
        //     }else{
        //         start_dateH1 = Date.newInstance(toDayTime.year(),10,1);
        //         end_dateH1 = Date.newInstance(toDayTime.year()+1,3,31);
        //     }
        //     List<Maintenance_Contract__c> conList1 = [select Id,Name,Contract_Start_Date__c,Contract_End_Date__c from Maintenance_Contract__c where Contract_Start_Date__c >= :start_dateH1 and Contract_End_Date__c <= :end_dateH1];
        //     conList.addAll(conList1);

        //       if(conList!=null){
        //             for (Maintenance_Contract__c con : conList) {
        //                     conIds.add(con.id);                        
        //              } 
        //         } 
        // }
        // if (type == '分母') {
            // 5条以上软性镜医院&&医院有效
        system.debug('执行start');
            Date egdTime = Date.newInstance(toDayTime.year()+1,3,1);
            List<AggregateResult> Asset1 = [select count(Id),Hospital__c from asset where Product2.ServiceCategory__c ='软性镜'  Group by Hospital__c having count(Id)>=5];
           if(Asset1!=null){
               for (AggregateResult a1 : Asset1) {
                   hospIds.add(String.valueOf(a1.get('Hospital__c')));
               }
           }
        // }                   
            
        return Database.getQueryLocator(query);
    }

    global void execute(Database.BatchableContext BC, list<Account> accList) {
        system.debug('执行execute');
        List<Account_Service_Of_Target__c> asotList = new List<Account_Service_Of_Target__c>();
        // if (type == '分子') {
        //     for (Account a : accList) {
        //         for (Asset as1 : a.Asset_Hospital__r) {
        //             // 标记是否覆盖率实际设备
        //             as1.IF_Coverage_Real_Asset__c = '1'; 
        //             AssetsNew.add(as1);
        //         }   
        //     } 
        // }
        // if (type == '分母') {
           
            // 实际设备合同时间区间1H(4,9);2H(10,3)
            if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
                start_dateH1 = Date.newInstance(toDayTime.year(),9,1);
                end_dateH1 = Date.newInstance(toDayTime.year(),9,30);
            }else{
                start_dateH1 = Date.newInstance(toDayTime.year(),3,1);
                end_dateH1 = Date.newInstance(toDayTime.year()+1,3,31);
            }
            for (Account acc1 : accList) {
                 Account_Service_Of_Target__c asot = new Account_Service_Of_Target__c();

                // 覆盖目标（硬）：泌尿科用硬性镜
                Integer mirror_1 = 0;
                // 覆盖目标（软）：鼻咽喉镜
                Integer mirror_2 = 0;
                //覆盖目标（周边）：光源
                Integer mirror_3 = 0;
                // 实际覆盖数（硬）：泌尿科用硬性镜
                Integer mirror_4 = 0;
                // 实际覆盖数（硬）：妇科用硬性镜
                Integer mirror_5 = 0;
                // 实际覆盖数（周边）：光源
                Integer mirror_6 = 0;
                // 实际覆盖数（软）：电子镜
                Integer mirror_7 = 0;
                List<Asset> AssetsTarget = new List<Asset>();
                List<Asset> AssetsReal = new List<Asset>();
                for (Asset ass1 : acc1.Asset_Hospital__r) {
                    
                    // 标记是否覆盖率目标设备
                    // ass1.IF_Coverage_Target_Asset__c = '1';
                     // AssetsTarget.add(ass1);
                    // 标记是否覆盖率实际设备
                    if (ass1.CurrentContract__r.Contract_End_Date__c >= start_dateH1 && ass1.CurrentContract__r.Contract_Conclusion_Date__c <= end_dateH1) {
                        ass1.IF_Coverage_Real_Asset__c = '1';
                        AssetsReal.add(ass1);
                    }
                   
                    if (ass1.Product2.Category4__c == '泌尿科用硬性镜') {
                        mirror_1++;
                    }
                    if(ass1.Product2.ServiceCategory__c =='软性镜'){
                        mirror_2++;
                    }
                    if (ass1.Product2.Category3__c == '光源') {
                        mirror_3++;
                    } 
                    if (AssetsTarget!=null) {
                        try {
                            update AssetsTarget;
                        }
                        catch (Exception e) {
                            iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsTarget:'+']'+e.getMessage()+'\n';
                         }
                    }
                     if (AssetsReal!=null) {
                        try {
                            update AssetsReal;
                        }
                        catch (Exception e) {
                            iflog.ErrorLog__c += 'ERROR'+'['+'update AssetsReal:'+']'+e.getMessage()+'\n';
                         }
                    }
                 }
                // List<Asset> assList = [select id,Product2.Category4__c,Product2.ServiceCategory__c,Product2.Category3__c from Asset
                //                     where IF_Coverage_Real_Asset__c = '1' and Hospital__c = :acc1.id];
                for (Asset AtoHp: AssetsReal) {
                    if (AtoHp.Product2.Category4__c == '泌尿科用硬性镜') {
                        mirror_4++;
                    }
                    if (AtoHp.Product2.Category4__c == '妇科用硬性镜') {
                        mirror_5++;
                    }
                    if (AtoHp.Product2.Category3__c == '光源') {
                        mirror_6++;
                    }
                    if (AtoHp.Product2.ServiceCategory__c =='软性镜') {
                        mirror_7++;
                    }
                }
                asot.Account_HP__c = acc1.id;
                asot.Coverage_Target_Account__c = true;
                asot.Target_Rigid_Mirror_2__c = mirror_1;
                asot.Target_Soft_Mirror_2__c = mirror_2;
                asot.Target_Correlation_Lightsource__c = mirror_3;
                asot.Finish_Rigid_Mirror_2__c = mirror_4;
                asot.Finish_Rigid_Mirror_3__c = mirror_5;
                asot.Finish_Correlation_Lightsource__c = mirror_6;
                asot.Finish_Rigid_Mirror_1__c = mirror_7;
                if (toDayTime.year()<=2029 && toDayTime.year()>=2023) {
                    asot.OCSM_Period__c =  'FY'+toDayTime.year();
                    if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
                        asot.OCSM_Period_half__c =  '1H';
                    }else{
                        asot.OCSM_Period_half__c =  '2H';
                    } 
                }
                asotList.add(asot);     
            }
            if (asotList!=null) {
                try {
                    insert asotList;
                }
                catch (Exception e) {
                    iflog.ErrorLog__c += 'ERROR'+'['+'insert asotList:'+']'+e.getMessage()+'\n';
                }  
            }
    }
    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRealCoverageBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}