global class OPDPlanOwnerIfStayOrNotSchedulable implements Schedulable {
	//---SWAG-BMS8EJ---20200323
	//请设置当担当人用户中的“在职/离职”为离职时，OPD计划为计划中的变为 取消。
    global void execute(SchedulableContext sc) {
        Id execBTId = Database.executeBatch(new OPDPlanWarningBatch(true), 200);
    }
}