@isTest
private class QistoSPOWebServiceTest {
	
	@isTest static void test_method_one() {
		// Implement test code
		
		StaticParameter.EscapeNFM001AgencyContractTrigger = true;
        ControllerUtil.EscapeNFM001Trigger = true;
		List<RecordType> rectCo = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and Name = '病院'];
        if (rectCo.size() == 0) {
            return;
        }
		List<RecordType> rectDpt = [select Id, Name from RecordType where IsActive = true and SobjectType = 'Account' and Name IN ('診療科 消化科', '診療科 呼吸科') order by Name desc];
        if (rectDpt.size() == 0) {
            return;
        }
        List<RecordType> rectAs = [select Id, Name from RecordType where IsActive = true and SobjectType = 'Asset' and Name = '备品'];
        if (rectAs.size() == 0) {
            return;
        }

		Account company1 = new Account();
        company1.RecordTypeId = rectCo[0].Id;
        company1.Name = '病院テスト1';
        List<Account> hps = new Account[]{company1};
        insert hps;

		List<Account> dc1s = [Select Id, Name, Department_Class_Label__c, Sys_Dept_Name_Change_Chk__c from Account where Parent.Id = :company1.Id order by Department_Class_Label__c];

		Account depart1 = new Account();
        depart1.RecordTypeId = rectDpt[0].Id;
        depart1.Name         = '*';
        depart1.Department_Name__c  = '診療科1';
        depart1.ParentId            = dc1s[0].Id;
        depart1.Department_Class__c = dc1s[0].Id;
        depart1.Hospital__c         = company1.Id;
        insert depart1;

        Product2 prd1 = new Product2();
        prd1.ProductCode_Ext__c     = 'HistoryPrd1';
        prd1.ProductCode            = 'HistoryPrd1';
        prd1.Repair_Product_Code__c = 'HistoryPrd1_RP';
        prd1.Name                   = 'HistoryPrd1';
        prd1.Manual_Entry__c        = false;
        prd1.Extend_new_product_gurantee__c = true;
        prd1.Extend_Gurantee_Start__c = Date.today().addDays(-60);
        prd1.Extend_Gurantee_End__c = Date.today().addDays(60);
        insert prd1;

        Oly_TriggerHandler.bypass('AssetHandler');

		Asset ast = new Asset();
        ast.RecordTypeId = rectAs[0].Id;
        ast.SerialNumber = 'abcdefg';
        ast.Name = '测试资产1';
        ast.AccountId              = depart1.Id;
        ast.Department_Class__c    = dc1s[0].Id;
        ast.Hospital__c            = company1.Id;
        ast.Product2Id             = prd1.Id;
        ast.Guarantee_period_for_products__c = Date.today();
        ast.InstallDate                      = Date.today();
        ast.Manage_type__c = '个体管理';
        ast.FirstApproveDate_old__c = Date.today().addDays(-30);
        insert ast;

		QIS_Report__c qis = new QIS_Report__c();
        qis.nonyushohin__c = ast.Id;
        //qis.consumable__c  = pro5.Id;
        qis.Hospital__c = company1.Id;
        qis.RC__c = UserInfo.getUserId();
        qis.Department_Class__c = dc1s[0].Id;
        qis.Hospital_Department__c = depart1.Id;
        qis.Damage_For_Doc_Or_Pat__c = '有';
        qis.Relation_With_The_Problem__c = '有可能';
        qis.Report_For_Goz__c = '不知道';
        //qis.IsSendQIS__c = true;
        insert qis;
        QistoSPOWebService.sendSPO('1111111111111');
        QistoSPOWebService.sendSPO(qis.Id);
	}
}