/**
 * This class contains unit tests for validating the behavior of Apex classes
 * and triggers.
 *
 * Unit tests are class methods that verify whether a particular piece
 * of code is working properly. Unit test methods take no arguments,
 * commit no data to the database, and are flagged with the testMethod
 * keyword in the method definition.
 *
 * All test methods in an organization are executed whenever Apex code is deployed
 * to a production organization to confirm correctness, ensure code
 * coverage, and prevent regressions. All Apex classes are
 * required to have at least 75% code coverage in order to be deployed
 * to a production organization. In addition, all triggers must have some code coverage.
 * 
 * The @isTest class annotation indicates this class only contains test
 * methods. Classes defined with the @isTest annotation do not count against
 * the organization size limit for all Apex scripts.
 *
 * See the Apex Language Reference for more information about Testing and Code Coverage.
 */
@isTest
private class SaveMContractFromReportControllerTest {

    static testMethod void myUnitTest() {
        Daily_Report__c dr = new Daily_Report__c(
            Reported_Date__c = Date.today(),
            Reporter__c = Userinfo.getUserId()
        );
        insert dr;
        
        Event__c ec = new Event__c(
            Daily_Report__c = dr.Id,
            StartDateTime__c = System.now(),
            EndDateTime__c = System.now(),
            Subject__c = 'Subject',
            Location__c = 'Location',
            ActivityDate__c = dr.Reported_Date__c
        );
        insert ec;
        
        List<RecordType> rectCo = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and Name = '病院'];
        if (rectCo.size() == 0) {
            throw new ControllerUtil.myException('not found 病院 recodetype');
        }
        List<RecordType> rectSct = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and Name = '戦略科室分類 呼吸科'];
        if (rectSct.size() == 0) {
            throw new ControllerUtil.myException('not found 戦略科室分類 recodetype');
        }
        List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and Name = '診療科 消化科'];
        if (rectDpt.size() == 0) {
            throw new ControllerUtil.myException('not found 診療科 recodetype');
        }
        // テストデータ
        Account company = new Account();
        company.RecordTypeId = rectCo[0].Id;
        company.Name         = 'HistoryTestCompany';
        upsert company;
        Account section = new Account();
        section.RecordTypeId = rectSct[0].Id;
        section.Name         = '*';
        section.Department_Class_Label__c = '消化科';
        section.ParentId                  = company.Id;
        section.Hospital_Department_Class__c = company.Id;
        upsert section;
        Account depart = new Account();
        depart.RecordTypeId = rectDpt[0].Id;
        depart.Name         = '*';
        depart.Department_Name__c  = 'HistoryTestDepart';
        depart.ParentId            = section.Id;
        depart.Department_Class__c = section.Id;
        depart.Hospital__c         = company.Id;
        upsert depart;

        Maintenance_Contract__c contract = new Maintenance_Contract__c();
        contract.Name                = 'test MC';
        contract.Hospital__c         = company.Id;
        contract.Department_Class__c = section.Id;
        contract.Department__c       = depart.Id;
        insert contract;
        
        ApexPages.currentPage().getParameters().put('eid', ec.Id);
        ApexPages.currentPage().getParameters().put('newid', contract.Id);
        SaveMContractFromReportController slf = new SaveMContractFromReportController();
        slf.init();
        
        ec = [select Maintenance_Contract_ID__c, Maintenance_Contract_Count__c from Event__c where Id = :ec.Id];
        System.assertEquals(contract.Id, ec.Maintenance_Contract_ID__c);
        System.assertEquals(1, ec.Maintenance_Contract_Count__c);
    }
}