public without sharing class StaticParameter {
    // 積み上げをIsScheduledフラグ設定の後に実行
    public static Boolean EventOpportunityPileUpExeFlg = false;
    // EventC⇒Event処理後、逆更新をスルー用
    public static Boolean NotUpdEventCFlg = false;
    // 積み上げ処理後、トリガをスルー用
    public static Boolean EscapeNFM001Trigger = false;
    public static Boolean EscapeNFM001AgencyContractTrigger = false;
    public static Boolean EscapeNFM001AgencyContractTrigger2 = false;
    public static Boolean EscapeNFM007Trigger = false;
    public static Boolean EscapeOpportunityBefUpdTrigger = false;
    public static Boolean EscapeOpportunityHpDeptUpdTrigger = false;
    public static Boolean EscapeSyncOpportunityTrigger = false;
    public static Boolean EscapeMaintenanceContractAfterUpdateTrigger = false;
    public static Boolean EscapeSyncProduct2Trigger = false;
    // trueのとき、リードのトリガーをスルーする
    public static Boolean EscapeLeadTrigger = false;
    public static Boolean EscapeAccountTrigger = false;

    //跳过订单的查询 
    public static Boolean ConsumableOrderTrigger = false;

    public static Boolean EscapeConsumableOrderDetail2Trigger = false;
    public static Boolean EscapeOrderDetail2Trigger = false;

    public static Boolean EscapeNFM010UpsertStatuAchievementsTrigger = false;
    // 直销耗材不直销 ConsumableAssetHander
    public static Boolean ConsumableAssetHanderTrigger = false;

    // 跳过不涉及备品借出的逻辑
    public static Boolean rentalApplyIsRunning = false;

    // accountdailyUpdate 跳过 更新询价
    public static Boolean EscapeOpportunityownerUpdate  = false;
    
    // 跳过修理AE更新
    public static Boolean EscapeRepairUpdate  = false;
    // 跳过QISAE更新
    public static Boolean EscapeQISUpdate = false;
    // 跳过学会·培训共享
    public static Boolean shareToOSCMFlag = false;
    // 跳过学会·培训trigger
    public static Boolean EscapeCampain = false;
    // 跳过QIS trigger
    public static Boolean EscapeQIS = false;
    // 跳过维修合同报价的设备更新
    public static Boolean EscapeVMCTrigger = false;
    // 跳过招标-询价关联trigger
    public static Boolean EscapeTOLinkTrigger = false;
    
    //wangweipeng     2021/09/01   在通过触发UpsertContactHandler更新contact表数据时，跳过更新user代码    start
    public static Boolean EscapeContactInsUpdUser = false;
    //wangweipeng     2021/09/01        end
    //EscapeAgencyOpportunityTrigger  thh 2021-09-16
    public static Boolean EscapeAgencyOpportunityTrigger = false;
    // 所有人变更的逻辑只在batch处理和相关性确认的时候触发 fxk 2021/9/28 Star
    public static Boolean EscapeOtherUpdateTenOwner = true;

    public static Boolean EscapeContactToUser = false;
    
    // 跳过NFM701接口
    public static Boolean EscapeNFM701Trigger = true;

    public StaticParameter(){
    }

}