@isTest
public with sharing class UpdateOPDStatusAndReasonBatchTest {
    @IsTest
    static void methodOne(){
         //医院 记录类型
      List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
      if (rectHp.size() == 0) {
          return;
      }
      //科室 记录类型
      List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
      if (rectDpt.size() == 0) {
          return;
      }
      
      //简档
      Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

      //用户
      User hpowner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
      insert hpowner;

      User hpowner2 = new User(Test_staff__c = true, LastName = 'hp1', FirstName = 'owner1', Alias = 'hp1', Work_Location__c = '北京', CommunityNickname = 'hpOwner1', Email = 'olympus_hpowner1@sunbridge.com', Username = 'olympus_hpowner1@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = '00e10000000xnp2');
      insert hpowner2;
      

      // User us = [select ID,IsActive from User where Id = :hpowner.Id];
      // System.assertEquals(null, us);

      //医院
      Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = hpOwner.Id);
      hp.FSE_GI_Main_Leader__c = hpOwner.Id;
      insert hp;

      //战略科室
      Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];
      //科室
      Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
      dpt.Name         = '*';
      dpt.Department_Name__c  = 'TestDepart';
      dpt.ParentId            = dc.Id;
      dpt.Department_Class__c = dc.Id;
      dpt.Hospital__c         = hp.Id;
      insert dpt;
      //科室1
      Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
      dpt1.Name         = '123';
      dpt1.Department_Name__c  = 'TestDepart1';
      dpt1.ParentId            = dc.Id;
      dpt1.Department_Class__c = dc.Id;
      dpt1.Hospital__c         = hp.Id;
      insert dpt1;

      OPDPlan__c oPDPlan4 = new OPDPlan__c();
      oPDPlan4.ownerId = hpowner2.id;
      oPDPlan4.Name = '20210916';
      oPDPlan4.OPDType__c = '事件';
      oPDPlan4.Status__c = '完毕未报告';
      oPDPlan4.RentalReson__c = 'OPD';
      oPDPlan4.Account_Laboratory__c =dpt.Id;//科室
      oPDPlan4.OPDPlan_ImplementDate__c = Date.today().adddays(30);//OPD计划实施日期
      oPDPlan4.NoOpp_Reason__c = 'HCP对应';//无询价申请理由
      oPDPlan4.if_OPDTarget__c=1;//是否OPD目标借用
      oPDPlan4.if_HaveSalestarget__c =1;//是否营业目标借用
      oPDPlan4.Cnt_OPD_ThisYear__c=1;//	本期OPD次数
      oPDPlan4.Cnt_OPD_LastYear__c=1;//
      oPDPlan4.if_HaveOpportunity__c=1;
      oPDPlan4.if_HaveEquipment__c =1;
      oPDPlan4.Cnt_Rentals__c =1;
      oPDPlan4.PlanProdDetail__c ='CV-290*4; GI-290镜子*1; GI-290镜子CF*1;';
      insert oPDPlan4;

      

      system.runAs(new User(Id = Userinfo.getUserId())){
        hpowner2.IsActive = false;
        update hpowner2;
      }

      //List<OPDPLan__C> opd = [select Id,noReport_Reason__c,Status__c from OPDPlan__c where Status__c in('完毕','完毕未报告') and UserEnable__c = false];
      //System.assertEquals(1 , opd.size());

      //string str =(string) hpowner.Id;

      Database.executeBatch(new UpdateOPDStatusAndReasonBatch(),10);  
      List<OPDPLan__C> opd = [select Id,ownerId,noReport_Reason__c,Status__c,UserEnable__c from OPDPlan__c];
      System.assertEquals(opd[0].UserEnable__c, false);
    }
   @IsTest
   static void methodTwo(){
       //医院 记录类型
       List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
       if (rectHp.size() == 0) {
           return;
       }
       //科室 记录类型
       List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
       if (rectDpt.size() == 0) {
           return;
       }
       
       //简档
       Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];
 
       //用户
       User hpowner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
       insert hpowner;
 
       User hpowner2 = new User(Test_staff__c = true, LastName = 'hp1', FirstName = 'owner1', Alias = 'hp1', Work_Location__c = '北京', CommunityNickname = 'hpOwner1', Email = 'olympus_hpowner1@sunbridge.com', Username = 'olympus_hpowner1@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = '00e10000000xnp2');
       insert hpowner2;
       
 
       // User us = [select ID,IsActive from User where Id = :hpowner.Id];
       // System.assertEquals(null, us);
 
       //医院
       Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = hpOwner.Id);
       hp.FSE_GI_Main_Leader__c = hpOwner.Id;
       insert hp;
 
       //战略科室
       Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];
       //科室
       Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
       dpt.Name         = '*';
       dpt.Department_Name__c  = 'TestDepart';
       dpt.ParentId            = dc.Id;
       dpt.Department_Class__c = dc.Id;
       dpt.Hospital__c         = hp.Id;
       insert dpt;
       //科室1
       Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
       dpt1.Name         = '123';
       dpt1.Department_Name__c  = 'TestDepart1';
       dpt1.ParentId            = dc.Id;
       dpt1.Department_Class__c = dc.Id;
       dpt1.Hospital__c         = hp.Id;
       insert dpt1;

       Contact contact2 = new Contact();
       contact2.AccountId = dpt.Id;
       contact2.FirstName = '責任者';
       contact2.LastName = 'test1经销商';
       insert contact2;

               // 产品
               Product2 pro5 = new Product2(Name='name05',IsActive=true,Family='SP',
               Fixture_Model_No__c='n05',Serial_Lot_No__c='S/N tracing',
               Fixture_Model_No_T__c = 'n05',
               ProductCode_Ext__c='pc05',Manual_Entry__c=false);
       insert pro5;

       //备品借出申请
       Rental_Apply__c raObj = new Rental_Apply__c();
       raObj.Name = 'testra';
       raObj.Product_category__c = 'GI';
       raObj.Demo_purpose1__c = '产品试用';
       raObj.demo_purpose2__c = FixtureUtil.raDemo_purpose2MAP.get('shiyongwuxunjia');
       raObj.direct_send__c = '医疗机构';
       raObj.Loaner_received_staff__c = '王五';
       raObj.Loaner_received_staff_phone__c = '110';
       raObj.direct_shippment_address__c = '北京市';
       raObj.Hospital__c = hp.Id;
       raObj.Strategic_dept__c = dc.Id;
       raObj.Account__c = dpt.Id;
       raObj.Request_shipping_day__c = Date.toDay();  // 希望到货日
       raObj.Hope_Lonaer_date_Num__c = 1;  // 希望借用天数
       // 预定归还日自动生成 预定归还日=（希望到货日+希望借用天数）-1
       // raObj.Request_return_day__c = Date.toDay();  // 预定归还日
       // B.OLY_OCM-669 入力规则: 希望借用天数不能为空
       raObj.Phone_number__c = '1234567890';
       raObj.Loaner_medical_Staff__c = contact2.Id;
       insert raObj;

       // 保有设备C (只有附属品 个体管理)
       Asset assetC1 = new Asset(Asset_Owner__c = 'Olympus');
       assetC1.RecordTypeId = System.Label.Asset_RecordType;
       assetC1.SerialNumber = 'assetC1';
       assetC1.Name = 'assetC1';
       assetC1.AccountId = dpt.Id;
       assetC1.Department_Class__c = dc.Id;
       assetC1.Hospital__c = hp.Id;
       assetC1.Product2Id = pro5.Id;
       assetC1.Quantity = 1;
       assetC1.Status = '有库存';
       assetC1.Manage_type__c = '个体管理';
       assetC1.Internal_asset_location__c = '北京 备品中心';
       assetC1.Loaner_accsessary__c = true;
       assetC1.Delete_Flag__c = false;
       assetC1.Freeze_sign__c = false;
       assetC1.Out_of_wh__c = 0;
       // 保有设备
       Asset asset = new Asset(Asset_Owner__c = 'Olympus');
       asset.RecordTypeId = System.Label.Asset_RecordType;
       asset.SerialNumber = 'asset';
       asset.Name = 'asset';
       asset.AccountId = dpt.Id;
       asset.Department_Class__c = dc.Id;
       asset.Hospital__c = hp.Id;
       asset.Product2Id = pro5.Id;
       asset.Quantity = 1;
       asset.Status = '有库存';
       asset.Manage_type__c = '个体管理';
       asset.Internal_asset_location__c = '北京 备品中心';
       asset.Loaner_accsessary__c = true;
       asset.Delete_Flag__c = false;
       asset.Freeze_sign__c = false;
       asset.Out_of_wh__c = 0;
       insert new Asset[] {assetC1, asset};

       // 备品配套(只有附属品)
       Fixture_Set__c fsObjC1 = new Fixture_Set__c();
       fsObjC1.Name = 'setC1';
       fsObjC1.Fixture_Set_Body_Model_No__c = 'modelNoC1';
       fsObjC1.Loaner_name__c = 'nameC1';
       insert fsObjC1;

       // 备品配套明细(只有附属品)
       Fixture_Set_Detail__c fsdObjC1 = new Fixture_Set_Detail__c();
       fsdObjC1.Name = 'detailAccessory';
       fsdObjC1.Name_CHN_Created__c = 'detailAccessoryName';
       fsdObjC1.Product2__c = pro5.Id;
       fsdObjC1.Fixture_Set__c = fsObjC1.Id;
       fsdObjC1.Is_Body__c = false;
       fsdObjC1.Is_Optional__c = true;
       fsdObjC1.UniqueKey__c = fsObjC1.Id + ':' + pro5.Id;
       fsdObjC1.SortInt__c = 1;
       insert fsdObjC1;

       // 借出备品配套一览
       Rental_Apply_Equipment_Set__c raesObjC1 = new Rental_Apply_Equipment_Set__c();
       raesObjC1.Rental_Apply__c = raObj.Id;
       raesObjC1.Fixture_Set__c = fsObjC1.Id;
       raesObjC1.Cancel_Select__c = false;
       raesObjC1.Shipment_request_time__c = Date.toDay();
       raesObjC1.Rental_Start_Date__c = Date.toDay();
       raesObjC1.Rental_End_Date__c = Date.toDay();
       raesObjC1.IndexFromUniqueKey__c = 1;
       raesObjC1.UniqueKey__c = '1:'+ fsObjC1.Id + ':1';
       insert raesObjC1;

       // 借出备品配套一览明细
       Rental_Apply_Equipment_Set_Detail__c raesdObjC1 = new Rental_Apply_Equipment_Set_Detail__c();
       raesdObjC1.Rental_Apply__c = raObj.Id;
       raesdObjC1.Fixture_Set_Detail__c = fsdObjC1.Id;
       raesdObjC1.Rental_Num__c = 1;
       raesdObjC1.Queue_Number__c = null;
       raesdObjC1.Is_Body__c = false;
       raesdObjC1.Rental_Apply_Equipment_Set__c = raesObjC1.Id;
       raesdObjC1.Asset__c = assetC1.Id;
       raesdObjC1.IndexFromUniqueKey__c = 1;
       raesdObjC1.UniqueKey__c = '1:'+ raesObjC1.Id + ':' + fsdObjC1.Id + ':1';
       raesdObjC1.Salesdepartment_before__c = '0.备品中心';
       raesdObjC1.Internal_asset_location_before__c = '北京 备品中心';
       raesdObjC1.Product_category_text__c = 'GI';
       raesdObjC1.Equipment_Type_text__c = '产品试用';
       raesdObjC1.Cancel_Select__c = true;
       raesdObjC1.Cancel_Reason__c = '主动取消';
       insert raesdObjC1;

       OPDPlan__c oPDPlan4 = new OPDPlan__c();
       oPDPlan4.ownerId = hpowner2.id;
       oPDPlan4.Name = '20210916';
       oPDPlan4.OPDType__c = '事件';
       oPDPlan4.Status__c = '完毕未报告';
       oPDPlan4.RentalReson__c = 'OPD';
       oPDPlan4.Account_Laboratory__c =dpt.Id;//科室
       oPDPlan4.OPDPlan_ImplementDate__c = Date.today().adddays(30);//OPD计划实施日期
       oPDPlan4.NoOpp_Reason__c = 'HCP对应';//无询价申请理由
       oPDPlan4.if_OPDTarget__c=1;//是否OPD目标借用
       oPDPlan4.if_HaveSalestarget__c =1;//是否营业目标借用
       oPDPlan4.Cnt_OPD_ThisYear__c=1;//	本期OPD次数
       oPDPlan4.Cnt_OPD_LastYear__c=1;//
       oPDPlan4.if_HaveOpportunity__c=1;
       oPDPlan4.if_HaveEquipment__c =1;
       oPDPlan4.Cnt_Rentals__c =1;
       oPDPlan4.PlanProdDetail__c ='CV-290*4; GI-290镜子*1; GI-290镜子CF*1;';
       oPDPlan4.Rental_Apply1__c = raObj.Id;
       insert oPDPlan4;
 
       
 
       system.runAs(new User(Id = Userinfo.getUserId())){
         hpowner2.IsActive = false;
         update hpowner2;
       }
 
       //List<OPDPLan__C> opd = [select Id,noReport_Reason__c,Status__c from OPDPlan__c where Status__c in('完毕','完毕未报告') and UserEnable__c = false];
       
       string str = (string)oPDPlan4.Id;
       
       Database.executeBatch(new UpdateOPDStatusAndReasonBatch(str),10); 
       List<OPDPLan__C> opd = [select Id,ownerId,noReport_Reason__c,Status__c,UserEnable__c from OPDPlan__c where id =:str];
       System.assertEquals(opd[0].UserEnable__c, false);
   }
  @IsTest
  static void methodThree(){
     //医院 记录类型
     List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
     if (rectHp.size() == 0) {
         return;
     }
     //科室 记录类型
     List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
     if (rectDpt.size() == 0) {
         return;
     }
     
     //简档
     Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

     //用户
     User hpowner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
     insert hpowner;

     User hpowner2 = new User(Test_staff__c = true, LastName = 'hp1', FirstName = 'owner1', Alias = 'hp1', Work_Location__c = '北京', CommunityNickname = 'hpOwner1', Email = 'olympus_hpowner1@sunbridge.com', Username = 'olympus_hpowner1@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = '00e10000000xnp2');
     insert hpowner2;
     
     //医院
     Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = hpOwner.Id);
     hp.FSE_GI_Main_Leader__c = hpOwner.Id;
     insert hp;

     //战略科室
     Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];
     //科室
     Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
     dpt.Name         = '*';
     dpt.Department_Name__c  = 'TestDepart';
     dpt.ParentId            = dc.Id;
     dpt.Department_Class__c = dc.Id;
     dpt.Hospital__c         = hp.Id;
     insert dpt;
     //科室1
     Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
     dpt1.Name         = '123';
     dpt1.Department_Name__c  = 'TestDepart1';
     dpt1.ParentId            = dc.Id;
     dpt1.Department_Class__c = dc.Id;
     dpt1.Hospital__c         = hp.Id;
     insert dpt1;

     OPDPlan__c oPDPlan4 = new OPDPlan__c();
     oPDPlan4.ownerId = hpowner2.id;
     oPDPlan4.Name = '20210916';
     oPDPlan4.OPDType__c = '事件';
     oPDPlan4.Status__c = '完毕未报告';
     oPDPlan4.RentalReson__c = 'OPD';
     oPDPlan4.Account_Laboratory__c =dpt.Id;//科室
     oPDPlan4.OPDPlan_ImplementDate__c = Date.today().adddays(30);//OPD计划实施日期
     oPDPlan4.NoOpp_Reason__c = 'HCP对应';//无询价申请理由
     oPDPlan4.if_OPDTarget__c=1;//是否OPD目标借用
     oPDPlan4.if_HaveSalestarget__c =1;//是否营业目标借用
     oPDPlan4.Cnt_OPD_ThisYear__c=1;//	本期OPD次数
     oPDPlan4.Cnt_OPD_LastYear__c=1;//
     oPDPlan4.if_HaveOpportunity__c=1;
     oPDPlan4.if_HaveEquipment__c =1;
     oPDPlan4.Cnt_Rentals__c =1;
     oPDPlan4.PlanProdDetail__c ='CV-290*4; GI-290镜子*1; GI-290镜子CF*1;';
     insert oPDPlan4;

     

     system.runAs(new User(Id = Userinfo.getUserId())){
       hpowner2.IsActive = false;
       update hpowner2;
     }

     
    
     string str = (string)oPDPlan4.Id;
     List<String> ls = new List<String>();
     ls.add(str);
     
     Database.executeBatch(new UpdateOPDStatusAndReasonBatch(ls),10); 
     List<OPDPLan__C> opd = [select Id,ownerId,noReport_Reason__c,Status__c,UserEnable__c from OPDPlan__c where id =:ls];
     System.assertEquals(opd[0].UserEnable__c, false);
    

     
  }
}