/**************************************************************************************************
@Author: 黄千龙
@Name: EquipmentCoverageTargetBatch
@CreateDate: 22/03/2022
@Description: 是否覆盖率目标（分母）
@Version 1.0
*****************************************************************************************************/
global class EquipmentCoverageTargetBatch implements Database.Batchable<sObject>,Database.Stateful {
    public String query;
    public Date start_dateH1 ;
    public Date end_dateH1 ;
    public List<Id> hospIds = new List<Id>();
    public Date toDayTime = Date.today();
    public String OCSM_Period_half;
    public String OCSM_Period;
    private BatchIF_Log__c iflog;
    public List < String > accountIdList;
    public Date egdTime;
    public Date geTIme;
    global EquipmentCoverageTargetBatch() {
        this.query = query;
        // OCSM_Period = 'FY'+(toDayTime.year()+1);
    }

    global EquipmentCoverageTargetBatch(List < String > accountIdList) {
        this.query = query;
        // OCSM_Period = 'FY'+(toDayTime.year()+1);
        this.accountIdList = accountIdList;
    }

    global Database.QueryLocator start(Database.BatchableContext bc) {
        
        system.debug('执行start');
        iflog = new BatchIF_Log__c();
        iflog.Type__c = 'PushNotification';
        iflog.Log__c  = 'EquipmentRealCoverageBatch start\n';
        iflog.ErrorLog__c = '';
        insert iflog;
        if (toDayTime.month() >= 4 && toDayTime.month() <= 9) {
            OCSM_Period_half = '1H';
        }else{
            OCSM_Period_half = '2H';
        }
        if(toDayTime.month() >= 1 && toDayTime.month() <= 3){
            OCSM_Period = 'FY'+(toDayTime.year());
        }else{
            OCSM_Period = 'FY'+(toDayTime.year()+1);
        }
        // 5条以上软性镜医院&&医院有效
        egdTime = Date.newInstance(toDayTime.year()+1,3,31);
        geTIme = Date.newInstance(3999,12,31);
        String query = 'SELECT Id,Hospital__c,Hospital__r.name,Hospital__r.IF_Coverage_Target_HP__c,IF_Coverage_Target_Asset__c,IF_Coverage_Real_Asset__c,'
                                            +'CurrentContract__r.Contract_End_Date__c,CurrentContract__r.Contract_Conclusion_Date__c,Product2.Category4__c,'
                                            +'Product2.ServiceCategory__c,Product2.Category3__c,OwnershipMachine_No__c,SerialNumber '
                                            +' FROM Asset '
                                            +' WHERE Product2.ServiceCategory__c != null '
                                            +' AND OwnershipMachine_No__c!=\'A22004A\' AND OwnershipMachine_No__c!=\'A37026A\' AND OwnershipMachine_No__c!=\'A4676A\' AND OwnershipMachine_No__c!=\'WA02946A\''
                                            +' AND Hospital__r.IF_Coverage_Target_HP__c = \'1\''
                                            +' AND (Product2.Maintenance_Price_Year__c != 0  and Product2.Maintenance_Price_Year__c != null)'
                                            +' AND (Status = \'使用中\' or Status = \'未使用\' or Status = \'不明\')';
        if (accountIdList != null && accountIdList.size() > 0) {
            query += ' AND hospital__c IN :accountIdList ';
        }                                  
             query += ' AND (IF_StopParts_production__c != \'1\' or Product2.PartSupplyFinishDate__c = null)'
                      +' AND (SerMarGuranteeType__c = null' 
                      +' OR (SerMarGuranteeType__c!=null AND Guarantee_period_for_products__c < :egdTime))'
                      +' ORDER BY Hospital__c';
        return Database.getQueryLocator(query);
    }

    global void execute(Database.BatchableContext BC, list<Asset> assList) {
        system.debug('执行execute');
        List<String> accIds = new List<String>();
        Set<String> OlympusList = new Set<String>();
        Integer i = 0;
        for(Asset ass1:assList){
            if (ass1.Hospital__r.name.contains('Olympus社内')) {
              OlympusList.add(ass1.OwnershipMachine_No__c+ass1.SerialNumber);
            }
            accIds.add(ass1.Hospital__c);
        }  
        List<Asset> assetList = new List<Asset>();
        Set<String> accIdSet = new Set<String>();
        List<Account_Service_Of_Target__c> targetObjs = new List<Account_Service_Of_Target__c>(); 
        Map<String,Account_Service_Of_Target__c> targetMap = new Map<String,Account_Service_Of_Target__c>();
        for(Account_Service_Of_Target__c target:[SELECT Id ,Target_Rigid_Mirror_2__c,Target_Soft_Mirror_2__c,Target_Correlation_Lightsource__c,Account_HP__c,OCSM_Period_half__c 
                                                FROM Account_Service_Of_Target__c 
                                                WHERE OCSM_Period_half__c = :OCSM_Period_half 
                                                AND OCSM_Period__c = :OCSM_Period
                                                AND Account_HP__c IN:accIds]){
            targetMap.put(target.Account_HP__c,target);
        }

        
        // for(asset assOlympus:[select id,name,OwnershipMachine_No__c,SerialNumber 
        //                         from asset 
        //                         where Hospital__r.name like  '%Olympus社内%']){
        //     // 把医院名为Olympus社内的型号和机身编码放入set后续做存在判断
            
        // }
        // Account_Service_Of_Target__c asot = null;
        for(Asset ass:assList){
            
            if(!accIdSet.contains(ass.Hospital__c)){
                if(!targetMap.containskey(ass.Hospital__c)){
                    // Account_Service_Of_Target__c asot = targetMap.get(ass.Hospital__c);
                    // asot.Target_Rigid_Mirror_2__c = 0;
                    // asot.Target_Soft_Mirror_2__c = 0;
                    // asot.Target_Correlation_Lightsource__c = 0;

                // }else{
                    Account_Service_Of_Target__c asot = new Account_Service_Of_Target__c();
                    asot.Account_HP__c = ass.Hospital__c;
                    asot.Coverage_Target_Account__c = true;
                    asot.Target_Rigid_Mirror_2__c = 0;
                    asot.Target_Soft_Mirror_2__c = 0;
                    asot.Target_Correlation_Lightsource__c = 0;
                    asot.OCSM_Period__c = OCSM_Period; 
                    asot.OCSM_Period_half__c = OCSM_Period_half;
                    targetMap.put(ass.Hospital__c,asot);
                }
                accIdSet.add(ass.Hospital__c);
            }
            ass.IF_Coverage_Target_Asset__c = '1';
            // 型号+机身编码
            String assTarget = ass.OwnershipMachine_No__c+ass.SerialNumber;
            if(OlympusList.contains(assTarget)){
                ass.IF_Coverage_Target_Asset__c = '0';
            }
            assetList.add(ass);
            if (!OlympusList.contains(assTarget)){
                if (ass.Product2.ServiceCategory__c == '硬性镜') {
                    targetMap.get(ass.Hospital__c).Target_Rigid_Mirror_2__c ++;
                }
                if(ass.Product2.ServiceCategory__c =='软性镜'){
                    targetMap.get(ass.Hospital__c).Target_Soft_Mirror_2__c ++;
                }
                if (ass.Product2.ServiceCategory__c == '周边') {
                    targetMap.get(ass.Hospital__c).Target_Correlation_Lightsource__c ++;
                }
            }
            i++;
        }
        system.debug('一共有'+i+'个设备');

        Oly_TriggerHandler.bypass('AssetTrigger');
        Oly_TriggerHandler.bypass('AssetHandlerCheck');
        system.debug('执行update AssetsTarget前');
        update assetList;  
        system.debug('执行update accList前'); 
        Oly_TriggerHandler.bypass('NFM701ControllerHandler');
        Oly_TriggerHandler.bypass('UpdateContractAimAmountHandler');
        UpSert targetMap.values();
    }

    global void finish(Database.BatchableContext BC) {
        iflog.Log__c += '\nEquipmentRealCoverageBatch end';
        String tmp = iflog.ErrorLog__c;
        if (tmp.length() > 65000) {
            tmp = tmp.substring(0, 65000);
            tmp += ' ...have more lines...';
            iflog.ErrorLog__c = tmp;
        }
        update iflog;
    }
}