@isTest
private class InquiryFormHandlerTest {

   static testMethod void updaue() {
        InquiryFormHandler.test();//先调用这个，然后继续补充测试类
   }
  @TestSetup
    static void setup(){
        TestDataUtility.CreatePIPolicyConfigurations(new string[]{'Agency_Contact__c','Contact'});
    } 
    
  @isTest
    static void Test1(){
        Test.setMock(HttpCalloutMock.class, new HttpMock());

        List<Agency_Contact__c> lra = new List<Agency_Contact__c>();
        lra.add(new Agency_Contact__c(
        ));
        insert lra;
        Test.startTest();
        //system.debug(PIHelper.getPIIntegrationInfo('Agency_Contact__c').newEncryptUrl);
        AWSServiceTool2.EncryptPushCore(Json.serialize(lra),'Agency_Contact__c');
        AWSServiceTool2.EncryptPushFuture(null,null);
        Test.stopTest();
    }

  @isTest
    static void Test2(){
        Test.setMock(HttpCalloutMock.class, new HttpMock());

        List<Agency_Contact__c> lra = new List<Agency_Contact__c>();
        lra.add(new Agency_Contact__c(
            Aws_Data_Id__c = '123456'
        ));
        insert lra;
        Test.startTest();
        //system.debug(PIHelper.getPIIntegrationInfo('Agency_Contact__c').newEncryptUrl);
        AWSServiceTool2.EncryptPushCore(Json.serialize(lra),'Agency_Contact__c');
        Test.stopTest();
    }

    @isTest
    static void Test3(){
        Test.setMock(HttpCalloutMock.class, new HttpMock());


        Test.startTest();
        AWSServiceTool2.EncryptPushData(new string[]{'0031000000O4Cff'});

        Test.stopTest();
    }

  //@isTest
  //  static void Test2(){
  //      Test.setMock(HttpCalloutMock.class, new HttpMock());

  //      List<Agency_Contact__c> lra = new List<Agency_Contact__c>();
  //      lra.add(new Agency_Contact__c(
  //          Id = 'a2R1m0000007BPD',
  //          Aws_Data_Id__c = '123456'
  //      ));
  //      Test.startTest();
  //      //system.debug(PIHelper.getPIIntegrationInfo('Agency_Contact__c').newEncryptUrl);
  //      AWSServiceTool2.EncryptPushCore(Json.serialize(lra),'Agency_Contact__c');
  //      Test.stopTest();
  //  }
    
    class HttpMock implements HttpCalloutMock{
        
        public HTTPResponse respond(HTTPRequest request) {
        // 创建一个假的回应
        System.debug('------------------------------------------------------');
        HttpResponse response = new HttpResponse();
        string body = '';
        system.debug(request.getEndpoint());
        if(request.getEndpoint().contains('token')){
            system.debug('url=token');
            response.setHeader('Content-Type', 'application/json');
      body='{ "message": "", "object": "freqfewqfewewfewfew", "status": "", "success": true, "timestamp": 0, "txId": "" }';          
        } else if(request.getEndpoint().contains('insert')){
            system.debug('url=Insert');
            response.setHeader('Content-Type', 'application/json');
      body='{ "message": "", "object": [ { "dataId": "123456", "directShippmentAddress": "", "directShippmentAddressEncrypt": "", "isDelete": 0, "phoneNumber": "", "phoneNumberEncrypt": "", "sfRecordId": "a2R1m0000007BPD" } ], "status": "", "success": true, "timestamp": 0, "txId": "" }';          
        } else if(request.getEndpoint().contains('update')){
            system.debug('url=update');
            response.setHeader('Content-Type', 'application/json');
      body='{ "message": "", "object": [ { "dataId": "123456", "directShippmentAddress": "", "directShippmentAddressEncrypt": "", "isDelete": 0, "phoneNumber": "", "phoneNumberEncrypt": "", "sfRecordId": "a2R1m0000007BPD" } ], "status": "", "success": true, "timestamp": 0, "txId": "" }';          
        } else{
          
        }
        
        response.setBody(body);
        response.setStatus('OK');
        response.setStatusCode(200);
        return response;
        // }
    }
    }
    @isTest static void test_method_one() {
      Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

        //User hpOwner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
        //insert hpOwner;
        User thisUser = [select Id from User where Id = :UserInfo.getUserId() ];
        System.runAs ( thisUser ){
          Inquiry_form__c inquiryform = new Inquiry_form__c();
          inquiryform.Name = '2019102101';
          inquiryform.Request1__c = '需要报价';
          inquiryform.Product1__c = '超声';
          inquiryform.FSE_Owner__c  = thisUser.id;
          insert inquiryform;
        }
        
    }
  //   @isTest static void test_method_two() {
  //     //医院
  //     List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
  //       if (rectHp.size() == 0) {
  //           return;
  //       }
  //       //科室
  //       List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
  //       if (rectDpt.size() == 0) {
  //           return;
  //       }

        
    // Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

    // User hpOwner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
  //     insert hpOwner;
  //     User hpOwner2 = new User(Test_staff__c = true, LastName = 'hp2', FirstName = 'owner', Alias = 'hp2', Work_Location__c = '重庆', CommunityNickname = 'hpOwner2', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner2@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
  //     insert hpOwner2;



  //     Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = hpOwner.Id);
  //       hp.FSE_GI_Main_Leader__c = hpOwner.Id;
  //       hp.FSE_SP_Main_Leader__c = hpOwner2.Id;
  //       insert hp;

  //       //战略科室
  //       Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];

  //       Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
  //       dpt.Name         = '*';
  //       dpt.Department_Name__c  = 'TestDepart';
  //       dpt.ParentId            = dc.Id;
  //       dpt.Department_Class__c = dc.Id;
  //       dpt.Hospital__c         = hp.Id;
  //       insert dpt;

  //       Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
  //       dpt1.Name         = '*';
  //       dpt1.Department_Name__c  = 'TestDepart1';
  //       dpt1.ParentId            = dc.Id;
  //       dpt1.Department_Class__c = dc.Id;
  //       dpt1.Hospital__c         = hp.Id;
  //       insert dpt1;

  //       Contact contact2 = new Contact();
  //       contact2.AccountId = dpt1.Id;
  //       contact2.FirstName = '責任者';
  //       contact2.LastName = 'test1经销商';
  //       insert contact2;

  //       Inquiry_form__c inquiryform = new Inquiry_form__c();
  //       inquiryform.Name = '2019102101';
  //       inquiryform.Hospital_Name__c = dpt1.Id;
  //       inquiryform.Status__c ='01.未跟进';
  //       inquiryform.Family_Name__c ='靳';
  //       inquiryform.Opportunity_Division__c = '询价';
  //       inquiryform.Contact_Name__c = contact2.Id;
  //       inquiryform.Reasons_options__c  ='客户无意向';
  //       inquiryform.Phone__c = '13844756322';
  //       inquiryform.Product1__c = '超声';
  //       inquiryform.Request1__c = '需要报价';
       
  //       insert inquiryform;

  //       List<Inquiry_form__c> info= [select id,Hospital_Name__c,Contact_Name__c,Department_Class__c,Hospital__c,Hospital__r.Name,OwnerId from Inquiry_form__c where id =: inquiryform.Id];
  //       System.assertEquals(hp.Id, info[0].Hospital_Name__c);
  //       System.assertEquals('hp-超声', info[0].Name);
  //   }
    @isTest static void test_method_three() {
        //医院
        List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
        if (rectHp.size() == 0) {
            return;
        }
        //科室
        List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
        if (rectDpt.size() == 0) {
            return;
        }

        
        Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

        //User hpOwner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
        //insert hpOwner;
        //User hpOwner2 = new User(Test_staff__c = true, LastName = 'hp2', FirstName = 'owner', Alias = 'hp2', Work_Location__c = '重庆', CommunityNickname = 'hpOwner2', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner2@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
        //insert hpOwner2;

        User thisUser = [select Id from User where Id = :UserInfo.getUserId() ];
        System.runAs ( thisUser ){
        Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = thisUser.Id);
        hp.FSE_GI_Main_Leader__c = thisUser.Id;
        hp.FSE_SP_Main_Leader__c = thisUser.Id;
        insert hp;

        //战略科室
        Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];

        Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
        dpt.Name         = '*';
        dpt.Department_Name__c  = 'TestDepart';
        dpt.ParentId            = dc.Id;
        dpt.Department_Class__c = dc.Id;
        dpt.Hospital__c         = hp.Id;
        insert dpt;

        Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
        dpt1.Name         = '*';
        dpt1.Department_Name__c  = 'TestDepart1';
        dpt1.ParentId            = dc.Id;
        dpt1.Department_Class__c = dc.Id;
        dpt1.Hospital__c         = hp.Id;
        insert dpt1;

        //Contact contact2 = new Contact();
        //contact2.AccountId = dpt1.Id;
        //contact2.FirstName = '責任者';
        //contact2.LastName = 'test1经销商';
        //insert contact2;

        Inquiry_form__c inquiryform = new Inquiry_form__c();
        inquiryform.Name = '2019102101';
        inquiryform.Hospital_Name__c = dpt1.Id;
        inquiryform.Status__c ='01.未跟进';
        inquiryform.Family_Name__c ='靳';
        inquiryform.Opportunity_Division__c = '询价';
        //inquiryform.Contact_Name__c = contact2.Id;
        inquiryform.Reasons_options__c  ='客户无意向';
        inquiryform.Phone__c = '13844756322';
        inquiryform.Product1__c = '超声';
        inquiryform.Request1__c = '需要报价';
        inquiryform.FSE_Owner__c  = thisUser.id;
        insert inquiryform;

         Test.setMock(HttpCalloutMock.class, new HttpMock());

            List<Agency_Contact__c> lra = new List<Agency_Contact__c>();
            lra.add(new Agency_Contact__c(
                Id = 'a2R1m0000007BPD',
                Aws_Data_Id__c = '123456'
            ));
            AWSServiceTool2.EncryptPushCore(Json.serialize(lra),'Agency_Contact__c');

        Inquiry_form__c inquiryform0 = new Inquiry_form__c(Id = inquiryform.id);
        inquiryform0.Hospital_Name__c = null;
        //System.runAs (inquiryform){
            update inquiryform0;
        //}
        }
    }
  //    static testMethod void testBeforeUpdate() {
  //      //医院
  //     List<RecordType> rectHp = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'HP'];
  //       if (rectHp.size() == 0) {
  //           return;
  //       }
  //       //科室
  //       List<RecordType> rectDpt = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and DeveloperName = 'Department_GI'];
  //       if (rectDpt.size() == 0) {
  //           return;
  //       }

        
    // Profile p = [select Id from Profile where id =:System.Label.ProfileId_SystemAdmin];

    // User hpOwner = new User(Test_staff__c = true, LastName = 'hp', FirstName = 'owner', Alias = 'hp', Work_Location__c = '北京', CommunityNickname = 'hpOwner', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
  //     insert hpOwner;
  //     User hpOwner2 = new User(Test_staff__c = true, LastName = 'hp2', FirstName = 'owner', Alias = 'hp2', Work_Location__c = '重庆', CommunityNickname = 'hpOwner2', Email = 'olympus_hpowner@sunbridge.com', Username = 'olympus_hpowner2@sunbridge.com', IsActive = true, EmailEncodingKey = 'ISO-2022-JP', TimeZoneSidKey = 'Asia/Tokyo', LocaleSidKey = 'ja_JP', LanguageLocaleKey = 'ja', ProfileId = p.id);
  //     insert hpOwner2;



  //     Account hp = new Account(RecordTypeId = rectHp[0].Id, Name = 'hp', OwnerId = hpOwner.Id);
  //       hp.FSE_GI_Main_Leader__c = hpOwner.Id;
  //       hp.FSE_SP_Main_Leader__c = hpOwner2.Id;
  //       insert hp;

  //       //战略科室
  //       Account dc = [select Id, Name, RecordType_DeveloperName__c, Account2__c from Account where ParentId = :hp.Id and RecordType_DeveloperName__c = 'Department_Class_GI'];

  //       Account dpt = new Account(RecordTypeId = rectDpt[0].Id);
  //       dpt.Name         = '*';
  //       dpt.Department_Name__c  = 'TestDepart';
  //       dpt.ParentId            = dc.Id;
  //       dpt.Department_Class__c = dc.Id;
  //       dpt.Hospital__c         = hp.Id;
  //       insert dpt;

  //       Account dpt1 = new Account(RecordTypeId = rectDpt[0].Id);
  //       dpt1.Name         = '*';
  //       dpt1.Department_Name__c  = 'TestDepart1';
  //       dpt1.ParentId            = dc.Id;
  //       dpt1.Department_Class__c = dc.Id;
  //       dpt1.Hospital__c         = hp.Id;
  //       insert dpt1;

  //       Contact contact2 = new Contact();
  //       contact2.AccountId = dpt1.Id;
  //       contact2.FirstName = '責任者';
  //       contact2.LastName = 'test1经销商';
  //       insert contact2;

  //       Inquiry_form__c inquiryform = new Inquiry_form__c();
  //       // inquiryform.Name = '2019102101';
  //       inquiryform.Hospital_Name__c = dpt1.Id;
  //       List<Account> dpecList = [select Id,Department_Class__c from Account where Id =: dpt1.Id];
  //       inquiryform.Department_Class__c = dpecList[0].Department_Class__c;
  //       inquiryform.Status__c ='01.未跟进';
  //       inquiryform.Company__c ='北京某某某测试公司';
  //       inquiryform.Family_Name__c ='靳';
  //       inquiryform.Opportunity_Division__c = '询价';
  //       inquiryform.Contact_Name__c = contact2.Id;
  //       inquiryform.Reasons_options__c  ='客户无意向';
  //       inquiryform.Phone__c = '13844756322';
  //       inquiryform.Product1__c = '超声';
  //       inquiryform.Request1__c = '需要报价';
  //       Test.startTest();
  //       insert inquiryform;
  //       ////.客户人员名前を変更する
  //       inquiryform.Phone__c = '16444756322';
  //       try {
  //           update inquiryform;
  //       } catch (Exception e) {

  //       }
        
  //       Test.stopTest();
  //    }
     // static testMethod void TestshareToOSCM(){
     //   List<Inquiry_form__c> tList = [SELECT Name, Id
     //            FROM Inquiry_form__c ORDER BY Id LIMIT 1];

     //    List<Inquiry_form__Share> tsList = [SELECT Id
     //            FROM Inquiry_form__Share WHERE ParentId = :tList AND RowCause = 'Manual'];
      

     //    Test.startTest();
     //    Delete tList[0];
     //    Test.stopTest();
     //    tsList = [SELECT Id
     //            FROM Inquiry_form__Share WHERE ParentId = :tList AND RowCause = 'Manual'];
     //    System.assertEquals(1, tsList.size());

     //    UnDelete tList[0];
     //    tsList = [SELECT Id
     //            FROM Inquiry_form__Share WHERE ParentId = :tList AND RowCause = 'Manual'];
     //    System.assertEquals(1, tsList.size());
     // }
}