@isTest
private class OnCallControllerTest {
    @TestSetup
    static void makeData(){
        TestDataUtility.CreatePIPolicyConfigurations(new String[]{'On_Call__c','On_Call__cV2'});
    }
    static testMethod void testMethod1() {
        String onCallJson = '{"Status_c__c":"跟进中","segment__c":"'+'000000000000000'+'","OwnerId":"0050l000005fcnt","Responsible_Person_HP__c":"Test","Oncall_report_number_c__c":"Test","Caller_phone__c":"186435431212","Hospital__c":"'+'000000000000000'+'","Trable_occur_day_c__c":"2022/03/24 10:45","Taking_call_Time_c__c":"2022/03/24 10:45","First_ploblem_c__c":"","From_c__c":"","To_c__c":"","Oncall_Equipment__c":"000000000000000","Oncall_Product_manual__c":"","Customer_Problem_c__c":"","FinishDataTime__c":"","Customer_sigh_c__c":false,"Customer_sigh_day_c__c":"","AWS_Data_Id__c":"1234567890"}';
        Test.startTest();
        On_Call__c onCall = new On_Call__c();
        ApexPages.StandardController sc = new ApexPages.StandardController(onCall);
        OnCallController occ = new OnCallController(sc);
        Test.stopTest();
    }
    static testMethod void testMethod2() {
        Test.startTest();
        String onCallJson = '{"Status_c__c":"跟进中","segment__c":"'+'000000000000000'+'","OwnerId":"0050l000005fcnt","Responsible_Person_HP__c":"Test","Oncall_report_number_c__c":"Test","Caller_phone__c":"186435431212","Hospital__c":"'+'000000000000000'+'","Trable_occur_day_c__c":"2022/03/24 10:45","Taking_call_Time_c__c":"2022/03/24 10:45","First_ploblem_c__c":"","From_c__c":"","To_c__c":"","Oncall_Equipment__c":"000000000000000","Oncall_Product_manual__c":"","Customer_Problem_c__c":"","FinishDataTime__c":"","Customer_sigh_c__c":false,"Customer_sigh_day_c__c":"","AWS_Data_Id__c":"1234567890"}';
        OnCallController.saveOnCall(onCallJson,'1adf234dafa',true);
        OnCallController.saveOnCall(onCallJson,'1adf234dafa',false);
        Test.stopTest();
    }
}