@isTest
public class PrintConsumblePDFControllertTest {
	// 20220824 ljh start
	@isTest(SeeAllData=true)
	static void PrintConsumblePDFControllertTest() {
	// static testMethod void PrintConsumblePDFControllertTest(){
	// 20220824 ljh end
		Profile prof1 = [select Id from Profile where Name ='901_经销商社区普通权限_2重验证(ET)'];
		List<RecordType> rectCo = [select Id from RecordType where IsActive = true and SobjectType = 'Account' and Name = '販売店'];
        if (rectCo.size() == 0) {
            return;
        }
		

		
		Account myAccount2 = new Account(name='Testaccount002',Dealer_discount__c =20,RecordTypeId = rectCo[0].Id);
		insert myAccount2;
		Contact core = new Contact(email='jplumber@salesforce.com', firstname='Joe',lastname='Plumber',accountid=myAccount2.id);
		insert core;
		// 20220824 ljh start
		// user MyUser_Test = New User(ContactId = core.id,Alias = 'newUser',Email='newuser@testorg.com',EmailEncodingKey='UTF-8', LastName='TestUser', LanguageLocaleKey='zh_CN',LocaleSidKey='zh_CN', ProfileId = prof1.Id,TimeZoneSidKey='Asia/Shanghai', UserName='testUser@testorg.com');
		// insert MyUser_Test;
		Profile prof = [select Id from Profile where Name ='901_经销商社区普通权限_2重验证(ET)'];
		User MyUser_Test = [select id,Contact.accountid from User WHERE ProfileId = :prof.Id and IsActive = true and UserPro_Type__c = 'ET' limit 1 ];
		Product2 prod01 = new Product2(Name='Test01:123',ProductCode='Test01',Asset_Model_No__c = 'Test01',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
        Product2 prod02 = new Product2(Name='Test02：123',ProductCode='Test02',Asset_Model_No__c = 'Test02',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
        Product2 prod03 = new Product2(Name='Test03123',ProductCode='Test03',Asset_Model_No__c = 'Test03',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
        Product2 prod04 = new Product2(Name='Test04:123',ProductCode='Test04',Asset_Model_No__c = 'Test04',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
        Product2 prod05 = new Product2(Name='Test05123',ProductCode='Test05',Asset_Model_No__c = 'Test05',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
        Product2 prod06 = new Product2(Name='Test06:123',ProductCode='Test06',Asset_Model_No__c = 'Test06',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
		insert new Product2[] {prod01,prod02,prod03,prod04,prod05,prod06};
		// 20220824 ljh end
		system.runAs(MyUser_Test){
			// Product2 prod01 = new Product2(Name='Test01:123',ProductCode='Test01',Asset_Model_No__c = 'Test01',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // Product2 prod02 = new Product2(Name='Test02：123',ProductCode='Test02',Asset_Model_No__c = 'Test02',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // Product2 prod03 = new Product2(Name='Test03123',ProductCode='Test03',Asset_Model_No__c = 'Test03',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // Product2 prod04 = new Product2(Name='Test04:123',ProductCode='Test04',Asset_Model_No__c = 'Test04',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // Product2 prod05 = new Product2(Name='Test05123',ProductCode='Test05',Asset_Model_No__c = 'Test05',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // Product2 prod06 = new Product2(Name='Test06:123',ProductCode='Test06',Asset_Model_No__c = 'Test06',SFDA_Status__c = '有効',Dealer_special_Object__c = true,ProduceCompany__c='生产企业名称:卡麦德医疗器械有限公司 KeyMed (Medical & Industrial Equipment)  Ltd;住所:KeyMed House Stock Road Southend-on-sea Essex SS2 5QH United Kingdom;联系方式:(01702)616333');
	        // insert new Product2[] {prod01,prod02,prod03,prod04,prod05,prod06};

			Product2__c pro1 = new Product2__c(Name='Pro001',OT_CODE_Text__c='Test001',Product2__c = prod01.Id);
			Product2__c pro2 = new Product2__c(Name='Pro002',OT_CODE_Text__c='Test002',Product2__c = prod02.Id);
			Product2__c pro3 = new Product2__c(Name='Pro003',OT_CODE_Text__c='Test003',Product2__c = prod03.Id);
			Product2__c pro4 = new Product2__c(Name='Pro004',OT_CODE_Text__c='Test004',Product2__c = prod04.Id);
			Product2__c pro5 = new Product2__c(Name='Pro005',OT_CODE_Text__c='Test005',Product2__c = prod05.Id);
			Product2__c pro6 = new Product2__c(Name='Pro006',OT_CODE_Text__c='Test006',Product2__c = prod06.Id);
			insert new Product2__c[] {pro4, pro5,pro6,pro1, pro2, pro3};
			
			/*Consumable_order__c createId = new Consumable_order__c();
			createId.Name = 'testMing';
			createId.Order_status__c = '草案中';
			createId.Order_date__c = Date.today();
			createId.Dealer_Info__c = myAccount2.Id;
			createId.Order_Reason__c = '其他';
			createId.RecordTypeid = System.Label.RT_ConOrder_Order;
			insert  createId;*/

			Consumable_order__c createId = new Consumable_order__c();
			createId.Name = 'OCM_01_001';
			createId.Order_status__c = '批准';
			createId.Order_type__c = '订单';
			// Order1.Dealer_Info__c = MyUser_Test.Contact.accountid;
			createId.Dealer_Info__c = MyUser_Test.Contact.accountid;
			createId.RecordTypeid = System.Label.RT_ConOrder_Order;
			createId.Total_num__c = 3;
			createId.OrderNumber_arrived__c =1;
			createId.Delivery_detail_count__c=1;
			createId.Order_ProType__c = 'ET';
			insert createId;




			Consumable_orderdetails__c good = new Consumable_orderdetails__c();
			good.recordtypeid= System.Label.RT_ConOrderDetail1_Order;
			good.Name = 'OCM0001';
			//good.Consumable_principal__c = createId.id;
			good.Consumable_order__c = createId.id;
			//good.Sum_of_money__c = 123;
			good.Consumable_count__c = 1;
			good.Consumable_Product__c = pro1.id;
			good.Product_code__c ='';
			good.Remarks__c ='';
			insert good;
			good = new Consumable_orderdetails__c();
			good.recordtypeid= System.Label.RT_ConOrderDetail1_Order;
			good.Name = 'OCM0003';
			//good.Consumable_principal__c = createId.id;
			good.Consumable_order__c = createId.id;
			//good.Sum_of_money__c = 123;
			good.Consumable_count__c = 1;
			good.Consumable_Product__c = pro3.id;
			
			insert good;
			good = new Consumable_orderdetails__c();
			good.recordtypeid= System.Label.RT_ConOrderDetail1_Order;
			good.Name = 'OCM0002';
			//good.Consumable_principal__c = createId.id;
			good.Consumable_order__c = createId.id;
			//good.Sum_of_money__c = 123;
			good.Consumable_count__c = 1;
			good.Consumable_Product__c = pro2.id;
			good.Product_code__c ='Test001';
			good.Remarks__c ='';
			insert good;
			good = new Consumable_orderdetails__c();
			good.recordtypeid= System.Label.RT_ConOrderDetail1_Order;
			good.Name = 'OCM0004';
			//good.Consumable_principal__c = createId.id;
			good.Consumable_order__c = createId.id;
			//good.Sum_of_money__c = 123;
			good.Consumable_count__c = 1;
			good.Consumable_Product__c = pro4.id;
			insert good;
			PageReference page = new PageReference('/apex/PrintConsumblePDF?ESetid='+createId.id);
			page.setRedirect(true);
			System.Test.setCurrentPage(page);
			PrintConsumblePDFController PPDF  = new PrintConsumblePDFController();

			PPDF.init();
			System.assertEquals(1, PPDF.printRecords.size());
		}
	}
}